-- 创建存储配置表
CREATE TABLE IF NOT EXISTS `yz_system_storage_config` (
  `id` bigint(20) unsigned NOT NULL AUTO_INCREMENT COMMENT '主键ID',
  `storage_type` varchar(20) NOT NULL DEFAULT 'local' COMMENT '存储类型: local-本地存储, qiniu-七牛云',
  `qiniu_access_key` varchar(255) DEFAULT NULL COMMENT '七牛云AccessKey',
  `qiniu_secret_key` varchar(255) DEFAULT NULL COMMENT '七牛云SecretKey',
  `qiniu_bucket` varchar(128) DEFAULT NULL COMMENT '七牛云Bucket名称',
  `qiniu_domain` varchar(255) DEFAULT NULL COMMENT '七牛云CDN域名',
  `qiniu_region` varchar(50) DEFAULT NULL COMMENT '七牛云存储区域',
  `create_time` datetime NOT NULL DEFAULT CURRENT_TIMESTAMP COMMENT '创建时间',
  `update_time` datetime DEFAULT NULL ON UPDATE CURRENT_TIMESTAMP COMMENT '更新时间',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COMMENT='系统存储配置表';

-- 插入默认配置（本地存储）
INSERT INTO `yz_system_storage_config` (`storage_type`, `create_time`) 
VALUES ('local', NOW())
ON DUPLICATE KEY UPDATE `storage_type` = 'local';
